Testing Specification Document

Group Name: Group members January 30, 1996

1 Scope of Testing 2 Test Plan

2.1 Test phases and builds 2.2 Schedule 2.3 Overhead software 2.4 Environment and Resources

3 Test Procedure

3.1 Order of integration Purpose

Classes and methods to be tested

3.1.1 Unit tests for Class X Description of tests for methods of class X:

ffl Method X: ffl Method Y: ffl Method Z:

Overhead software description:

Test case data:

Expected Results:

4 References 5 Appendices