0.35 0.37 0.39 0.41 0.43 0.45 0.47 0.49 0.51 0.53 0.55 0.3

0.35

0.4

0.45

0.5

0.55

0.6

0.65

0.7

0.75

0.8

Threshold

Correlation coefficient cc1 for LVQ cc1 for MGLVQ cc2 for LVQ cc2 for MGLVQ