0.35 0.37 0.39 0.41 0.43 0.45 0.47 0.49 0.51 0.53 0.55 0

0.5

1

1.5

2

2.5

3

Threshold

FP

LVQ for trainng set

MGLVQ for training set

LVQ for test set

MGLVQ for test set